1.25"

1.6"

64.75"

Axial Station of

Secondary Vertex

(with proper account for dimple sagitta (0.01") and secondary sagitta

(0.018")

Axial station of bottom of center section

1.2 Meter Secondary Location as measured by Nelson Caldwell 00/08/16

Mirror

Mirror Cell

Center Section

Secondary